ALTER TABLE usage_logs ADD COLUMN IF NOT EXISTS image_output_tokens INTEGER NOT NULL DEFAULT 0;
ALTER TABLE usage_logs ADD COLUMN IF NOT EXISTS image_output_cost DECIMAL(20, 10) NOT NULL DEFAULT 0;
